Copyright: OverSeer PMS  ® 1994  Anaplastic Software


Getting Started
OverSeer PMS v 1.2

   Getting Started --- Read First

Important:  Follow these steps in order.

1 	If you are using a program that changes Program Managers' (PM) restriction settings, reset PM to default as noted in that programs' documentation.  Alternatively, start OverSeer and click the PM default button to reset PM to default.

2 	Use the default password SENTRY to access OverSeer.

Using PMS:

Start OverSeer PMS in the usual fashion.  A message box will appear warning that a password is needed to use the program.  If the password is not known, the cancel button should be used.  The password entry box can only be dismissed by entering the correct password or by forcing OverSeer to close (ie. Exiting Windows).

THE REMAINDER OF THE HELP FILE IS ONLY AVAILABLE FROM WITHIN OVERSEER PMS.

Exit